10^{-13}

10^{-12}

10^{-11}

10^{-10}

10^{-9}

10^{-8}

10^{-7}

10^{-6}

10^{-1} 1 10 10^2 10^3

Energy (GeV)

Integreted flux (cm^{-2} s^{-1})

Egret

Glast

Celeste

Whipple Imager