Coincidence of two analog sums

97/02/05 21.05

10^{-1}

1

10

10^2

10^3

10^4

10^5

10^6

10 10^2 Group threshold (mV below pedestal)

Rate ( hz )

10^{-1}

1

10

10^2

10^3

10^4

10^5

10^6

10^{-1} 1 10 Threshold (photoelectrons per heliostat)

Rate (hz)

3+3 3+2 2+2