Site=12.282

Regulus drift scans with F3 at 1150 volts

0 2.5 5 7.5 10

0 50

ID 2222

97/01/27 13.10

seconds uA

Site=12.182 0 10 20 30

0 50

ID 9999

Site=12.082 0

20

40

0 50

ID 8888

Site=11.982 0 20 40 60 80

0 50

ID 3333

Site=11.882 0 20 40 60

0 50

ID 1111

Site=11.782 0 20 40 60

0 50

ID 4444

Site=11.682 0 10 20 30 40

0 50

ID 5555

Site=11.582 0

10

20

0 50

ID 6666

Site=11.482 0

5

10

0 50

ID 7777

5 samples per second, 1 sample per bin