Five-fold coincidences

97/04/02 13.48

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

0 0.05 0.1 0.15 0.2 0.25 Pointing altitude above detector (1/km)

Coincidences per second

4 km 6 8 10 12 30 parallel

80 uA n.s.l., 65 mV threshold

10^{-1} 1 10 10^2

10^3

10^4

10 10^2 Threshold (mV)

Coincidences per second

65 uA, 11 Dec 57 uA, 12 Dec

power law index = 1.2